htemp Entries 425 Mean 0.7214 RMS 0.02124

MUMON SI Beam direction [ mrad ]

0.66 0.68 0.7 0.72 0.74 0.76 0.78 0.8 0 2 4 6 8 10 12 14^{htempEntries 425}_{Mean 0.7214}