htemp

Entries 425 Mean 1.48 RMS 0.0074

protons] 12 MUMON IC Total Q [ nC / 10

1.46 1.47 1.48 1.49 1.5 1.51 0 2 4 6 8 10 12 14 16^{htempEntries 425}_{Mean 1.48}