Active Plane #

0 2 4 6 8 10

Mean of Edep [MeV]

3 4 5 6 7 8 Entries 181 Mean x 3.633 Mean y 5.763 RMS x 2.693 RMS y 0.4728

0 1 2 3 4 5 6 7

Int Mode

0 10 20 30 40 50

Active Plane #

0 2 4 6 8 10 Entries 181 Mean x 18.42 Mean y 3.31 RMS x 14.51 RMS y 2.665

0 1 2 3 4 5 6 7 8

Int Mode

0 10 20 30 40 50

Mean of Edep [MeV]

3 4 5 6 7 8 Entries 181 Mean x 18.92 Mean y 5.776 RMS x 14.51 RMS y 0.4699

0 1 2 3 4 5 6 7 8 9

Int Mode

0 10 20 30 40 50

Total Hit

0 2 4 6 8 10 12 14 16 18 20^{Entries 181}Mean x 17.15_{Mean y 8.317}

RMS x 14.97 RMS y 5.605

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 Entries 181 Mean x 17.15 Mean y 8.317