/ ndf

2χ 11.93 / 4 Constant 58.5±

9883 Mean 5.62±

-41.45 Sigma 12.8± 620.8

vertical position [cm]

-400 -200 0 200 400

# of events / module

0 2000

4000

6000

8000

10000

12000

Horn 1,2,3 = 0 kA

/ ndf

2χ 19 / 4 Constant 48.6±

6830 Mean 8.2±

-41.8 Sigma 20.9± 689.6