/ ndf

2χ 17.83 / 4 Constant 152±

6.395e+04 Mean 1.12±

-12.79 Sigma 1.8± 427.1

vertical position [cm]

-400 -200 0 200 400

Neutrinos / module

0

20000

40000

60000

80000

Horn 1,2,3 = 320 kA

/ ndf

2χ 4.899 / 4 Constant 126±

4.357e+04 Mean 1.3± -12.3 Sigma 2.1± 422.8