/ ndf

2χ 8.148 / 4 Constant 39.4±

4364 Mean 6.23±

-26.69 Sigma 12.4± 530

vertical position [cm]

-400 -200 0 200 400

# of events / module

0 1000

2000

3000

4000

5000

Horn 1 = 320 kA, 2,3 = 0 kA

/ ndf

2χ 16.89 / 4 Constant 32.8±

2979 Mean 7.7± -20 Sigma 15.7± 536.9