/ ndf

2χ 58.89 / 4 Constant 60±

1.028e+04 Mean 4.07±

24.05 Sigma 7.9± 532.7

horizontal position [cm]

-400 -200 0 200 400

# of events / module

0 2000

4000

6000

8000

10000

12000

Horn 1,2,3 = 0 kA

/ ndf

2χ 43.05 / 4 Constant 49.6±

7161 Mean 5.31±

26.84 Sigma 10.8± 557.9