/ ndf

2χ 15.43 / 4 Constant 153±

6.484e+04 Mean 1.05±

-1.65 Sigma 1.6± 411.6

horizontal position [cm]

-400 -200 0 200 400

Neutirnos / module

0

20000

40000

60000

80000^{/ ndf}

Horn 1,2,3 = 320 kA

/ ndf

2χ 6.852 / 4 Constant 127±

4.418e+04 Mean 1.2555 ± -0.8749 Sigma 1.9± 408.6