/ ndf

2χ 4.146 / 4 Constant 33.3±

3069 Mean 5.974±

-6.016 Sigma 10.6± 469.9

horizontal position [cm]

-400 -200 0 200 400

# of events / module

0 1000

2000

3000

4000

5000

/ ndf

2χ 4.332 / 4 Constant 40.2±

4531 Mean 4.773±

-1.098 Sigma 8.2± 461.7

Horn 1 = 320 kA, 2,3 = 0 kA