p.e. / layer

0 10 20 30 40 50 60 70 80 90 100

# of events / 14 modules

0 200 400 600 800 1000

1200

1400

1600

1800

2000

# of active planes > 1 , Horn 1 = 320 kA, 2,3 = 0 kA (only CC)