Neutrino Energy [GeV]

0 1 2 3 4 5 6

Flux Ratio (All cut / No cut)

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 Horn 1,2,3 = 320 kA (Only CC)