Entries 163 / ndf

2χ 3.049 / 4 Constant 3.45±

29.99 Mean 44.052 ± 4.265 Sigma 66.4± 380.7

X [cm]

-400 -200 0 200 400 0 5 10 15 20 25 30 35 40 ±

150*(mod-3) {nact>1}