Entries 18814 / ndf

2χ 7.966 / 4 Constant 35.1±

3389 Mean 4.725 ± -6.988 Sigma 7.4± 419.5

horizontal position [cm]

-400 -200 0 200 400 events

0 500 1000

1500

2000

2500

3000

3500 ±

Profile of horizontal (Eth333keV ActCut>1)