Entries 13929 / ndf

2χ 0.2665 / 3 Constant 6.6±

107.4 Mean 33.3±

-12 Sigma 53.5±

406.3

horizontal position [cm]

-400 -200 0 200 400 normalize events

0 20 40 60 80 100 120 Profile of horizontal (Eth666keV ActCut>2)