Entries 18548 / ndf

2χ 0.2722 / 3 Constant 7.6±

142.7 Mean 29.13 ± -13.06 Sigma 47.1± 408.2

horizontal position [cm]

-400 -200 0 200 400 normalize events

0 20 40 60 80 100 120 140 ±

Profile of horizontal (Eth666keV ActCut>1)