Entries 14192 / ndf

2χ 0.3331 / 3 Constant 6.6±

109.5 Mean 33.01 ± -11.41 Sigma 52.7± 405.8

horizontal position [cm]

-400 -200 0 200 400 normalize events

0 20 40 60 80 100 120 ±

Profile of horizontal (Eth333keV ActCut>2)