Spill#

242.16 242.1605 242.161 242.1615 242.162 242.1625 242.163 242.1635 242.164 310 ×

Diff of interval time [sec]

3.520000079

3.52000008

3.520000081

3.520000083

3.520000084

3.520000085

3.520000086

3.520000087

3.520000089

3.52000009

3.520000091

Interval of consequtive spills TT Run:270132

Spill#

242.16 242.1605 242.161 242.1615 242.162 242.1625 242.163 242.1635 242.164 310 ×

Diff of interval time [sec]

3.520000079

3.52000008

3.520000081

3.520000083

3.520000084

3.520000085

3.520000086

3.520000087

3.520000089

3.52000009

3.520000091

Interval of consequtive spills Mot Run:270132

Spill#

242.16 242.1605 242.161 242.1615 242.162 242.1625 242.163 242.1635 242.164 310 ×

Diff of interval time [sec]

3.520000079

3.52000008

3.520000081

3.520000083

3.520000084

3.520000085

3.520000086

3.520000087

3.520000089

3.52000009

3.520000091

Interval of consequtive spills Rub Run:270132