Spill#

241.8 241.81 241.82 241.83 241.84 310 ×

Diff of interval time [sec]

0 200 400 600 800 1000

1200

1400

Interval of consequtive spills TT Run:270127

Spill#

241.8 241.81 241.82 241.83 241.84 310 ×

Diff of interval time [sec]

0 200 400 600 800 1000

1200

1400

Interval of consequtive spills Mot Run:270127

Spill#

241.8 241.81 241.82 241.83 241.84 310 ×

Diff of interval time [sec]

0 200 400 600 800 1000

1200

1400

Interval of consequtive spills Rub Run:270127