Spill#

241.78 241.782 241.784 241.786 241.788 241.79 241.792 310 ×

Diff of interval time [sec]

0

100 200

300 400

500 600

Interval of consequtive spills TT Run:270126

Spill#

241.78 241.782 241.784 241.786 241.788 241.79 241.792 310 ×

Diff of interval time [sec]

0 100

200

300

400

500

600

Interval of consequtive spills Mot Run:270126

Spill#

241.78 241.782 241.784 241.786 241.788 241.79 241.792 310 ×

Diff of interval time [sec]

0 100 200

300 400

500 600

Interval of consequtive spills Rub Run:270126