Spill#

240.856 240.858 240.86 240.862 240.864 310 ×

Diff of interval time [sec]

3.520000079

3.52000008

3.520000081

3.520000083

3.520000084

3.520000085

3.520000086

3.520000087

3.520000089

3.52000009

3.520000091

Interval of consequtive spills TT Run:270122

Spill#

240.856 240.858 240.86 240.862 240.864 310 ×

Diff of interval time [sec]

3.52000007

3.520000075

3.52000008

3.520000085

3.52000009

3.520000095

3.5200001

Interval of consequtive spills Mot Run:270122

Spill#

240.856 240.858 240.86 240.862 240.864 310 ×

Diff of interval time [sec]

3.520000079

3.52000008

3.520000081

3.520000083

3.520000084

3.520000085

3.520000086

3.520000087

3.520000089

3.52000009

3.520000091

Interval of consequtive spills Rub Run:270122