Spill#

240.441 240.442 240.443 240.444 240.445 240.446 240.447 240.448 310 ×

Diff of interval time [sec]

0 0.5 1 1.5 2 2.5 3 3.5

Interval of consequtive spills TT Run:270109

Spill#

240.441 240.442 240.443 240.444 240.445 240.446 240.447 240.448 310 ×

Diff of interval time [sec]

0 0.5 1 1.5 2 2.5 3 3.5

Interval of consequtive spills Mot Run:270109

Spill#

240.441 240.442 240.443 240.444 240.445 240.446 240.447 240.448 310 ×

Diff of interval time [sec]

0 0.5 1 1.5 2 2.5 3 3.5

Interval of consequtive spills Rub Run:270109