Spill#

239.85 239.855 239.86 239.865 239.87 239.875 239.88 239.885 239.89 310 ×

Diff of interval time [sec]

0

100

200

300

400

500

600 Interval of consequtive spills TT Run:270105

Spill#

239.85 239.855 239.86 239.865 239.87 239.875 239.88 239.885 239.89 310 ×

Diff of interval time [sec]

0

100

200

300

400

500

600 Interval of consequtive spills Mot Run:270105

Spill#

239.85 239.855 239.86 239.865 239.87 239.875 239.88 239.885 239.89 310 ×

Diff of interval time [sec]

0

100

200

300

400

500

600 Interval of consequtive spills Rub Run:270105