Spill#

10 20 30 40 50 60 70 80 90 100

Diff of interval time [sec]

1

1.2

1.4

1.6

1.8

2 Interval of consequtive spills TT Run:241593

Spill#

10 20 30 40 50 60 70 80 90 100

Diff of interval time [sec]

1

1.2

1.4

1.6

1.8

2 Interval of consequtive spills Mot Run:241593

Spill#

10 20 30 40 50 60 70 80 90 100

Diff of interval time [sec]

1

1.2

1.4

1.6

1.8

2 Interval of consequtive spills Rub Run:241593