621400 621600 621800 622000 622200 622400 622600

6.000000137

6.000000141

6.000000144

6.000000148

6.000000151

6.000000155

6.000000159

6.000000162

6.000000166

6.000000169

6.000000173

Interval of consequtive spills TT Run:241529

621400 621600 621800 622000 622200 622400 622600

6.00000012

6.00000013

6.00000014

6.00000015

6.00000016

6.00000017

6.00000018

6.00000019

6.0000002

Interval of consequtive spills Mot Run:241529

621400 621600 621800 622000 622200 622400 622600

6.000000149

6.00000015

6.000000151

6.000000153

6.000000154

6.000000155

6.000000156

6.000000157

6.000000159

6.00000016

6.000000161

Interval of consequtive spills Rub Run:241529