25990 25992 25994 25996 25998 26000 26002 26004 26006 26008

3.520000079

3.52000008

3.520000081

3.520000083

3.520000084

3.520000085

3.520000086

3.520000087

3.520000089

3.52000009

3.520000091

Interval of consequtive spills TT

25990 25992 25994 25996 25998 26000 26002 26004 26006 26008

3.52000005

3.52000006

3.52000007

3.52000008

3.52000009

3.5200001

3.52000011

Interval of consequtive spills Mot

25990 25992 25994 25996 25998 26000 26002 26004 26006 26008

3.520000079

3.52000008

3.520000081

3.520000083

3.520000084

3.520000085

3.520000086

3.520000087

3.520000089

3.52000009

3.520000091

Interval of consequtive spills Rub