62120 62140 62160 62180 62200 62220 62240 62260 62280 62300

3.520000079

3.52000008

3.520000081

3.520000083

3.520000084

3.520000085

3.520000086

3.520000087

3.520000089

3.52000009

3.520000091

Interval of consequtive spills LTC Run:270335