239.892 239.893 239.894 239.895 239.896 239.897 239.898 239.899 310 × 3.520000079

3.52000008

3.520000081

3.520000083

3.520000084

3.520000085

3.520000086

3.520000087

3.520000089

3.52000009

3.520000091

Interval of consequtive spills LTC Run:270106