1580600 1580800 1581000 1581200 1581400 1581600 1581800 1582000 1582200

3.520000079

3.52000008

3.520000081

3.520000083

3.520000084

3.520000085

3.520000086

3.520000087

3.520000089

3.52000009

3.520000091

Interval of consequtive spills LTC Run:241654