623800 624000 624200 624400 624600 624800 625000 625200 625400

6.000000149

6.00000015

6.000000151

6.000000153

6.000000154

6.000000155

6.000000156

6.000000157

6.000000159

6.00000016

6.000000161

Interval of consequtive spills LTC Run:241533