409.6 409.8 410 410.2 410.4 410.6 410.8 411 411.2 310 × 6.000000149

6.00000015

6.000000151

6.000000153

6.000000154

6.000000155

6.000000156

6.000000157

6.000000159

6.00000016

6.000000161

Interval of consequtive spills LTC Run:1499