Spill#

241960 241980 242000 242020 242040 242060

Interval time [sec]

-30 -20 -10 0 10 20 30 40 Diff of interval of consequtive spills Mot-TT Run:270130

Spill#

241960 241980 242000 242020 242040 242060

Interval time [sec]

-10

-5

0

5

10 Diff of interval of consequtive spills Rub-TT Run:270130

Spill#

241960 241980 242000 242020 242040 242060

Interval time [sec]

-40 -30 -20 -10 0 10 20 30 Diff of interval of consequtive spills Rub-Mot Run:270130