Spill#

240867 240867.5 240868 240868.5 240869

Interval time [sec]

-10 -5 0 5 10 15 20 Diff of interval of consequtive spills Mot-TT Run:270123

Spill#

240867 240867.5 240868 240868.5 240869

Interval time [sec]

0

0.2

0.4

0.6

0.8

1

Diff of interval of consequtive spills Rub-TT Run:270123

Spill#

240867 240867.5 240868 240868.5 240869

Interval time [sec]

-20 -15 -10 -5 0 5 10 Diff of interval of consequtive spills Rub-Mot Run:270123