621400 621600 621800 622000 622200 622400 622600 -40 -30 -20 -10 0 10 20 30 40 Diff of interval of consequtive spills Mot-TT Run:

621400 621600 621800 622000 622200 622400 622600 -10

-5

0

5

10 Diff of interval of consequtive spills Rub-TT Run:

621400 621600 621800 622000 622200 622400 622600 -40 -30 -20 -10 0 10 20 30 Diff of interval of consequtive spills Rub-Mot Run: