206.2 206.4 206.6 206.8 207 207.2 207.4 207.6 207.8 310 × 6.000000137

6.000000141

6.000000144

6.000000148

6.000000151

6.000000155

6.000000159

6.000000162

6.000000166

6.000000169

6.000000173

Interval of consequtive spills TT

206.2 206.4 206.6 206.8 207 207.2 207.4 207.6 207.8 310 × 6.00000012

6.00000013

6.00000014

6.00000015

6.00000016

6.00000017

6.00000018

6.00000019

Interval of consequtive spills Mot

206.2 206.4 206.6 206.8 207 207.2 207.4 207.6 207.8 3 10× 6.000000149

6.00000015

6.000000151

6.000000153

6.000000154

6.000000155

6.000000156

6.000000157

6.000000159

6.00000016

6.000000161

Interval of consequtive spills Rub