25980 25980.5 25981 25981.5 25982 25982.5 25983

3.52000007

3.520000075

3.52000008

3.520000085

3.52000009

Interval of consequtive spills TT

25980 25980.5 25981 25981.5 25982 25982.5 25983

3.52000006

3.520000065

3.52000007

3.520000075

3.52000008

3.520000085

3.52000009

3.520000095

3.5200001

Interval of consequtive spills Mot

25980 25980.5 25981 25981.5 25982 25982.5 25983

3.520000079

3.52000008

3.520000081

3.520000083

3.520000084

3.520000085

3.520000086

3.520000087

3.520000089

3.52000009

3.520000091

Interval of consequtive spills Rub