25780 25800 25820 25840 25860 25880 25900 25920 25940 25960 25980 -30 -20 -10 0 10 20 30 Diff of interval of consequtive spills Mot-TT

25780 25800 25820 25840 25860 25880 25900 25920 25940 25960 25980 -10

-5

0

5

10 Diff of interval of consequtive spills Rub-TT

25780 25800 25820 25840 25860 25880 25900 25920 25940 25960 25980 -30 -20 -10 0 10 20 30 Diff of interval of consequtive spills Rub-Mot