1200 1300 1400 1500 1600 -40 -30 -20 -10 0 10 20 30 40

Diff of intercal of consequtive spills Mot-TT

1200 1300 1400 1500 1600 0

0.2

0.4

0.6

0.8

1

Diff of intercal of consequtive spills Rub-TT

1200 1300 1400 1500 1600 -40 -30 -20 -10 0 10 20 30 40

Diff of intercal of consequtive spills Rub-Mot