0

0.1

0.2

0.3

0.4

0.5

0.6

0.7

0.8 vtx vs Z

T p^0π rec.

[mm] vtxZ ^0π

Rec.

1000 1500 2000 2500 3000 3500 4000 4500 5000 5500 6000

]c [MeV/

TP ^0π Rec.

0 50 100 150 200 250 300 350 400 450 500 Observed

87 1

9

0

0

0

0

0

1

Expected

87 0.12±0.17

0.52 ± 7.24

0.03 ± 0.03

0.03 ± 0.03

0.01 ± 0.01

0.11 ± 0.16

0.25 ± 1.08

0.16 ± 0.34