x(t)-Correlation plot

x-Distance from the Wire ΜcmΝ

Minimum Drift Time ΜμsecΝ

*10

Positron drift lines from a wire

y-Axis ΜcmΝ

Contours of V

y-Axis ΜcmΝ

Contours of E

y-Axis ΜcmΝ

Contours of V

*10 y-Axis ΜcmΝ

*10

Contours of E

*10 y-Axis ΜcmΝ

*10